OmniBook Pop-Up Mouse

Sensitivity

Use the slider bar to set how fast the pointer moves across the screen. Drag the scroll box or use the RIGHT and LEFT ARROW keys to set the sensitivity between Low (pointer moves slowly across the screen) and High (pointer moves quickly across the screen).